/*
 Navicat Premium Data Transfer

 Source Server         : 127.0.0.1.3307
 Source Server Type    : MySQL
 Source Server Version : 80037
 Source Host           : 127.0.0.1:3307
 Source Schema         : ma_sgzb_cq

 Target Server Type    : MySQL
 Target Server Version : 80037
 File Encoding         : 65001

 Date: 22/11/2024 13:24:54
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sys_config
-- ----------------------------
DROP TABLE IF EXISTS `sys_config`;
CREATE TABLE `sys_config`  (
                               `config_id` int(0) NOT NULL AUTO_INCREMENT COMMENT '参数主键',
                               `config_name` varchar(100) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT '' COMMENT '参数名称',
                               `config_key` varchar(100) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT '' COMMENT '参数键名',
                               `config_value` varchar(500) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT '' COMMENT '参数键值',
                               `config_type` char(1) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT 'N' COMMENT '系统内置（Y是 N否）',
                               `create_by` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT '' COMMENT '创建者',
                               `create_time` datetime(0) NULL DEFAULT NULL COMMENT '创建时间',
                               `update_by` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT '' COMMENT '更新者',
                               `update_time` datetime(0) NULL DEFAULT NULL COMMENT '更新时间',
                               `remark` varchar(500) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '备注',
                               PRIMARY KEY (`config_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 13 CHARACTER SET = utf8mb3 COLLATE = utf8mb3_general_ci COMMENT = '参数配置表' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of sys_config
-- ----------------------------
INSERT INTO `sys_config` VALUES (6, 'zlptUrl', 'zlptUrl', 'https://test-rental.zhgkxt.com/proxy/item-center/supply/item/pushNotifications', 'Y', 'adminBns', '2024-11-18 10:37:57', 'adminBns', '2024-11-18 13:05:19', NULL);
INSERT INTO `sys_config` VALUES (7, 'updateItemStatusUrl', 'updateItemStatusUrl', 'https://test-rental.zhgkxt.com/proxy/item-center/supply/item/updateItemStatus', 'Y', 'adminBns', '2024-11-18 10:42:07', 'adminBns', '2024-11-18 13:05:29', NULL);
INSERT INTO `sys_config` VALUES (8, 'intelligentUrl', 'intelligentUrl', 'https://www.zhgkxt.com/api/clientapi/public/externalApi', 'Y', 'adminBns', '2024-11-18 10:45:08', 'adminBns', '2024-11-18 13:05:37', NULL);
INSERT INTO `sys_config` VALUES (9, 'intelligentAppKey', 'intelligentAppKey', 'abc123', 'Y', 'adminBns', '2024-11-18 13:05:55', '', NULL, NULL);
INSERT INTO `sys_config` VALUES (10, 'intelligentAesKey', 'intelligentAesKey', 'abcdefghijklmnop', 'Y', 'adminBns', '2024-11-18 13:06:23', '', NULL, NULL);

SET FOREIGN_KEY_CHECKS = 1;
