/*
 Navicat Premium Data Transfer

 Source Server         : localhost-57
 Source Server Type    : MySQL
 Source Server Version : 50743
 Source Host           : localhost:3306
 Source Schema         : ma_sgzb_nw

 Target Server Type    : MySQL
 Target Server Version : 50743
 File Encoding         : 65001

 Date: 09/08/2024 12:16:04
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for data_receive_detail
-- ----------------------------
DROP TABLE IF EXISTS `data_receive_detail`;
CREATE TABLE `data_receive_detail`  (
                                        `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '主键ID',
                                        `receive_id` int(11) NULL DEFAULT NULL COMMENT '推送ID',
                                        `type_id` int(11) NULL DEFAULT NULL COMMENT '机具类型id',
                                        `ma_id` int(11) NULL DEFAULT NULL COMMENT '机具编码ID',
                                        `rent_time` datetime NULL DEFAULT NULL COMMENT '租赁日期',
                                        `rent_price` varchar(10) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '租赁价格',
                                        `unit_id` int(11) NULL DEFAULT NULL COMMENT '所属单位',
                                        `supplier` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '生产厂家',
                                        `out_factory_time` datetime NULL DEFAULT NULL COMMENT '出厂日期',
                                        `is_new` int(11) NULL DEFAULT NULL COMMENT '是否新装备（0 是  1否）',
                                        `check_code` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '检验证编号',
                                        `check_unit` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '检验单位',
                                        `check_date` datetime NULL DEFAULT NULL COMMENT '检验日期',
                                        `next_check_date` datetime NULL DEFAULT NULL COMMENT '下次检验日期',
                                        `ma_user_name` varchar(10) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '机手姓名',
                                        `status` int(11) NULL DEFAULT 0 COMMENT '状态（0 未接收  1已接收）',
                                        PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '推送接收明细表' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Table structure for data_receive_info
-- ----------------------------
DROP TABLE IF EXISTS `data_receive_info`;
CREATE TABLE `data_receive_info`  (
                                      `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '主键ID',
                                      `receive_status` int(11) NULL DEFAULT 0 COMMENT '接收状态(0：未完成 1 已完成)',
                                      `push_num` int(11) NULL DEFAULT NULL COMMENT '推送数量',
                                      `receive_date` datetime NULL DEFAULT NULL COMMENT '推送日期',
                                      PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '推送接收表' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
