/*
 Navicat Premium Data Transfer

 Source Server         : 192.168.0.14.2009
 Source Server Type    : MySQL
 Source Server Version : 80200
 Source Host           : 192.168.0.14:2009
 Source Schema         : ma_sgzb_cq

 Target Server Type    : MySQL
 Target Server Version : 80200
 File Encoding         : 65001

 Date: 26/08/2024 10:36:32
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for ma_whole_set
-- ----------------------------
DROP TABLE IF EXISTS `ma_whole_set`;
CREATE TABLE `ma_whole_set`  (
  `id` int(0) NOT NULL AUTO_INCREMENT,
  `whole_type_name` varchar(40) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '配套名称',
  `ascription_type` int(0) NULL DEFAULT NULL COMMENT '1：主体设备  2：配套设备',
  `type_id` int(0) NULL DEFAULT NULL COMMENT '机具类型配件id',
  `parent_id` int(0) NULL DEFAULT NULL COMMENT '父级id',
  `part_num` int(0) NULL DEFAULT NULL COMMENT '整套配件数',
  `status` varchar(1) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT '1' COMMENT '是否启用(0 否，1 是)',
  `create_by` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '创建人',
  `create_time` datetime(0) NULL DEFAULT NULL COMMENT '创建时间',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 686 CHARACTER SET = utf8mb3 COLLATE = utf8mb3_general_ci ROW_FORMAT = DYNAMIC;

SET FOREIGN_KEY_CHECKS = 1;
