INSERT INTO `bm_project_info`(`pro_id`, `pro_name`, `status`, `type_id`, `link_man`, `telphone`, `dept_id`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `start_date`, `company_id`, `completion_date`) VALUES (109, '重庆金山-明月山500kV线路工程', '0', 6, NULL, NULL, 102, '0', '', '2024-07-23 10:04:41', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_info`(`pro_id`, `pro_name`, `status`, `type_id`, `link_man`, `telphone`, `dept_id`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `start_date`, `company_id`, `completion_date`) VALUES (110, '川渝特高压交流工程天府南-铜梁1000kV线路工程', '0', 6, NULL, NULL, 102, '0', '', '2024-07-23 10:05:10', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_info`(`pro_id`, `pro_name`, `status`, `type_id`, `link_man`, `telphone`, `dept_id`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `start_date`, `company_id`, `completion_date`) VALUES (111, '金上-湖北±800kV特高压直流输电工程', '0', 6, NULL, NULL, 102, '0', '', '2024-07-23 10:05:22', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_info`(`pro_id`, `pro_name`, `status`, `type_id`, `link_man`, `telphone`, `dept_id`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `start_date`, `company_id`, `completion_date`) VALUES (112, '哈密-重庆±800千伏特高压直流输电线路工程', '0', 6, NULL, NULL, 102, '0', '', '2024-07-23 10:05:40', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_info`(`pro_id`, `pro_name`, `status`, `type_id`, `link_man`, `telphone`, `dept_id`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `start_date`, `company_id`, `completion_date`) VALUES (113, '宁夏-湖南±800千伏特高压直流输电线路工程', '0', 6, NULL, NULL, 102, '0', '', '2024-07-23 10:05:47', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_info`(`pro_id`, `pro_name`, `status`, `type_id`, `link_man`, `telphone`, `dept_id`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `start_date`, `company_id`, `completion_date`) VALUES (114, '哈密-重庆800kV特高压渝北换流站', '0', 7, NULL, NULL, 202, '0', '', '2024-07-23 10:06:14', '', '2024-07-23 10:06:36', NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_info`(`pro_id`, `pro_name`, `status`, `type_id`, `link_man`, `telphone`, `dept_id`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `start_date`, `company_id`, `completion_date`) VALUES (115, '铜梁1000kV变电站新建工程', '0', 7, NULL, NULL, 202, '0', '', '2024-07-23 10:06:58', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_info`(`pro_id`, `pro_name`, `status`, `type_id`, `link_man`, `telphone`, `dept_id`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `start_date`, `company_id`, `completion_date`) VALUES (116, '巴南仙池（龙洲湾二号）110kV输变电工程', '0', 7, NULL, NULL, 202, '0', '', '2024-07-23 10:07:04', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_info`(`pro_id`, `pro_name`, `status`, `type_id`, `link_man`, `telphone`, `dept_id`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `start_date`, `company_id`, `completion_date`) VALUES (117, '重庆渝昆高铁江津北牵引变220kV外部工程', '0', 7, NULL, NULL, 202, '0', '', '2024-07-23 10:07:11', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_info`(`pro_id`, `pro_name`, `status`, `type_id`, `link_man`, `telphone`, `dept_id`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `start_date`, `company_id`, `completion_date`) VALUES (118, '重庆九龙坡谢家湾220kV送出工程', '0', 7, NULL, NULL, 202, '0', '', '2024-07-23 10:07:19', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_info`(`pro_id`, `pro_name`, `status`, `type_id`, `link_man`, `telphone`, `dept_id`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `start_date`, `company_id`, `completion_date`) VALUES (119, '重庆金山-明月山500kV线路工程（变电）', '0', 7, NULL, NULL, 202, '0', '', '2024-07-23 10:07:35', '', NULL, NULL, NULL, NULL, NULL);
