INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (257, NULL, '重庆金山-明月山500kV线路工程（第一标段）', '0', 6, NULL, NULL, NULL, 102, NULL, NULL, NULL, '0', '', '2024-07-23 10:08:09', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (258, NULL, '重庆金山-明月山500kV线路工程（第二标段）', '0', 6, NULL, NULL, NULL, 102, NULL, NULL, NULL, '0', '', '2024-07-23 10:08:24', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (259, NULL, '川渝特高压交流工程天府南-铜梁1000kV线路工程（重庆段）', '0', 6, NULL, NULL, NULL, 102, NULL, NULL, NULL, '0', '', '2024-07-23 10:08:31', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (260, NULL, '金上-湖北±800kV特高压直流输电工程（渝2标）（湘潭）', '0', 6, NULL, NULL, NULL, 102, NULL, NULL, NULL, '0', '', '2024-07-23 10:08:54', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (261, NULL, '金上-湖北±800kV特高压直流输电工程（渝2标）（岳池）', '0', 6, NULL, NULL, NULL, 102, NULL, NULL, NULL, '0', '', '2024-07-23 10:09:09', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (262, NULL, '哈密-重庆±800千伏特高压直流输电线路工程', '0', 6, NULL, NULL, NULL, 102, NULL, NULL, NULL, '0', '', '2024-07-23 10:10:02', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (263, NULL, '宁夏-湖南±800千伏特高压直流输电线路工程（渝1标）', '0', 6, NULL, NULL, NULL, 102, NULL, NULL, NULL, '0', '', '2024-07-23 10:10:29', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (264, NULL, '哈密-重庆800kV特高压渝北换流站', '0', 7, NULL, NULL, NULL, 202, NULL, NULL, NULL, '0', '', '2024-07-23 10:10:47', '', '2024-07-23 10:11:46', NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (265, NULL, '铜梁1000kV变电站新建工程', '0', 7, NULL, NULL, NULL, 202, NULL, NULL, NULL, '0', '', '2024-07-23 10:11:37', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (266, NULL, '巴南仙池（龙洲湾二号）110kV输变电工程', '0', 7, NULL, NULL, NULL, 202, NULL, NULL, NULL, '0', '', '2024-07-23 10:11:59', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (267, NULL, '重庆渝昆高铁江津北牵引变220kV外部工程', '0', 7, NULL, NULL, NULL, 202, NULL, NULL, NULL, '0', '', '2024-07-23 10:12:08', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (268, NULL, '重庆九龙坡谢家湾220kV送出工程', '0', 7, NULL, NULL, NULL, 202, NULL, NULL, NULL, '0', '', '2024-07-23 10:12:15', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (269, NULL, '重庆金山-明月山500kV线路工程（二标）', '0', 7, NULL, NULL, NULL, 202, NULL, NULL, NULL, '0', '', '2024-07-23 10:12:23', '', NULL, NULL, NULL, NULL, NULL);
INSERT INTO `bm_project_lot`(`lot_id`, `pro_id`, `lot_name`, `status`, `type_id`, `link_man`, `telphone`, `own_pro`, `dept_id`, `is_share`, `lon`, `lat`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `completion_date`, `start_date`) VALUES (270, NULL, '重庆金山-明月山500kV线路工程（一标）', '0', 7, NULL, NULL, NULL, 202, NULL, NULL, NULL, '0', '', '2024-07-23 10:12:32', '', NULL, NULL, NULL, NULL, NULL);
