INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (12, '河南兰兴电力机械有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:49:33', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (13, '甘肃诚信电力机具制造有限责任公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:49:44', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (14, '兰州众科机械制造有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:49:49', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (15, '宜兴博宇电力机械有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:49:56', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (16, '河南电力博大科技有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:50:03', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (17, '扬州电力机具厂有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:50:09', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (18, '常熟市电力机具有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:50:16', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (19, '常熟电力', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:50:21', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (20, '象山永久电力设备机具有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:50:26', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (21, '扬州国电', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:50:34', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (22, '重庆嘉顿城市机械有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:50:39', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (23, '重庆鼎兴电力工程有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:50:44', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (24, '扬州振东', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:50:49', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (25, '扬州电力', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:50:54', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (26, '泰州市昊鑫电力机具有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:50:59', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (27, '汉中群峰机械制造有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:51:04', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (28, '泰州昊鑫', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:51:08', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (29, '汉中群峰', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:51:13', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (30, '扬州振动', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:51:18', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (31, '江苏长虹', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:51:23', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (32, '扬州新东方/湘潭电力', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:51:31', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (33, '泰州市昊鑫电力', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:51:36', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (34, '江苏长虹机具有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:51:41', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (35, '自贡滤油机厂', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:51:46', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (36, '自贡川滤', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:51:50', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (37, '重庆渝能', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:51:54', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (38, '自贡华瑞', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:51:59', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (39, '重庆锋渝', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:52:03', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (40, '重庆陆顺科技', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:52:07', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (41, '吉林一机', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:52:15', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (42, '重庆克利尔过滤设备制造有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:52:20', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (43, '吉林省一机分离机械制造股份有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:52:25', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (44, '重庆玺能', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:52:30', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (45, '上海通用', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:52:34', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (46, '江苏南通', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:52:40', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (47, '南通科源', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:52:44', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (48, '河南日立信', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:52:48', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (49, '泰普联合科技开发（北京）有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:52:53', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (50, '南通鑫源', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:52:57', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (51, '德国', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:53:01', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (52, '迪罗', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:53:07', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (53, '重庆锋渝电气有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:53:12', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (54, '重庆西电动力设备', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:53:16', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (55, '上海斯坦福动力设备有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:53:20', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (56, '扬州威力动力设备有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:53:27', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (57, '江苏兴华昌发电设备有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:53:33', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (58, '重庆翼虎动力机械有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:53:37', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (59, '山东华全动力股份有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:53:42', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (60, '重庆大江动力设备有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:53:46', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (61, '江南康融', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:53:51', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (62, '徐州海伦哲专用车辆股份有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:53:55', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (63, '徐州重型机械有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:53:59', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (64, '重庆皖力起重设备有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:54:04', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (65, '诺力智能装备股份有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:54:09', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (66, '重庆美和机电有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:54:13', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (67, '河北霞光电力工具有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:54:17', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (68, '苏州热工研究院有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:54:22', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (69, '依斯普激光', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:54:26', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (70, '武汉先同科技有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:54:30', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (71, '安徽世福仪器有限公司', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:54:34', '', NULL, NULL, NULL, 0);
INSERT INTO `ma_supplier_info`(`supplier_id`, `supplier`, `address`, `legal_person`, `primary_contact`, `phone`, `business_scope`, `business_license`, `del_flag`, `create_by`, `create_time`, `update_by`, `update_time`, `remark`, `company_id`, `status`) VALUES (72, '上海振丹传感器仪表厂', NULL, '0', NULL, NULL, NULL, NULL, '0', '', '2024-07-17 09:54:39', '', NULL, NULL, NULL, 0);
