/*
 Navicat Premium Data Transfer

 Source Server         : 192.168.0.14-prod_rental
 Source Server Type    : MySQL
 Source Server Version : 80200
 Source Host           : 192.168.0.14:2009
 Source Schema         : ma_sgzb_nw

 Target Server Type    : MySQL
 Target Server Version : 80200
 File Encoding         : 65001

 Date: 16/08/2024 09:19:12
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for report_alarm
-- ----------------------------
DROP TABLE IF EXISTS `report_alarm`;
CREATE TABLE `report_alarm`  (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT '主键',
  `iot_code` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT 'iot设备编码',
  `device_alarm_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '记录的uuid 唯一确定这一条记录',
  `start_alarm` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '报警内容',
  `start_alarm_time` datetime NULL DEFAULT NULL COMMENT '报警时间',
  `whether_push` int UNSIGNED NULL DEFAULT 0 COMMENT '是否推送  0:否，1:是',
  `whether_verify` int UNSIGNED NULL DEFAULT 0 COMMENT '是否核实 0:否，1:是',
  `verify_situation` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '核实情况',
  `verify_by` bigint NULL DEFAULT NULL COMMENT '核实人',
  `verify_time` datetime NULL DEFAULT NULL COMMENT '核实时间',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `nw_device_alarm_id`(`device_alarm_id` ASC) USING BTREE COMMENT '报警id\r\n'
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb3 COLLATE = utf8mb3_general_ci COMMENT = '报警处理表' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
