/*
 Navicat Premium Data Transfer

 Source Server         : 192.168.0.14.2009
 Source Server Type    : MySQL
 Source Server Version : 80200
 Source Host           : 192.168.0.14:2009
 Source Schema         : ma_sgzb_cq

 Target Server Type    : MySQL
 Target Server Version : 80200
 File Encoding         : 65001

 Date: 12/09/2024 10:40:08
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for ma_config
-- ----------------------------
DROP TABLE IF EXISTS `ma_config`;
CREATE TABLE `ma_config`  (
                              `config_id` int(0) NOT NULL AUTO_INCREMENT COMMENT '参数主键',
                              `config_name` varchar(100) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT '' COMMENT '参数名称',
                              `config_key` varchar(100) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT '' COMMENT '参数键名',
                              `config_value` varchar(500) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT '' COMMENT '参数键值',
                              `config_type` char(1) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT 'N' COMMENT '系统内置（Y是 N否）',
                              `create_by` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT '' COMMENT '创建者',
                              `create_time` datetime(0) NULL DEFAULT NULL COMMENT '创建时间',
                              `update_by` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT '' COMMENT '更新者',
                              `update_time` datetime(0) NULL DEFAULT NULL COMMENT '更新时间',
                              `remark` varchar(500) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '备注',
                              PRIMARY KEY (`config_id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 6 CHARACTER SET = utf8mb3 COLLATE = utf8mb3_general_ci COMMENT = '参数配置表' ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of ma_config
-- ----------------------------

SET FOREIGN_KEY_CHECKS = 1;
